Table 4. The sample of Mira S stars, SC stars and C stars with no Tc lines, monitored with CORAVEL. The spectral type is from the GCGSS, and B � V from the GCPD

HD/DM GCGSS Var Sp. B � V 1967 9 R And S5-7/4-5e 1.97 4350 12 U Cas S5/3e 2.00 14028 49 W And S7/1e 1.70 29147 103 T Cam S6/5e 2.30 53791 307 R Gem S5/5 2.10 70276 494 V Cnc S3/6e 2.20 110813 803 S UMa S3/6e 2.10 117287 – R Hya M6e-M9eS 1.60 185456 1150 R Cyg S6/6e 2.00 187796 1165 χ Cyg S7/1.5e 1.80 190629 1188 AA Cyg S6/3 1.80 195763 1226 Z Del S4/2e 2.00 211610 1292 X Aqr S6,3e: 2.00 286340 117 GP Ori SC7/8 2.90 44544 212 FU Mon S7/7 3.00

�04^ffi1617 244 V372 Mon SC7/7 2.50 �08^ffi1900 344 S4/6 1.90

54300 – R CMi CS 2.50 198164 – CY Cyg CS 2.00 209890 – RZ Peg CS 3.90 46687 – UU Aur C no Tc 3.00 76221 – X Cnc C no Tc 3.36 108105 – SS Vir C no Tc 3.00

This article was processed by the author using Springer-Verlag

LATEX A&A style file_{L-AA} version 3.